         180           3
   8.76978410780793        6.62912786880177        4.59856920446468     
   15.5641958664823        16.0300145877844        16.5592235912524     
 -7.749300418068716E-004  0.000000000000000E+000
   1.00173274822395       0.000000000000000E+000
  0.998743919351759       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
