         180           8
  4.517968120419912E-003 -0.589234289668963       -1.25179085455875     
  -1.90896699635333       -2.51811391636646       -3.05975049626331     
  -3.64494126740969       -4.14008943333907     
  -13.0760971698161       -13.1278344746415       -13.2240879282753     
  -13.3847957542796       -13.6239229166449       -13.9029328418349     
  -14.1653441443213       -14.4509753115227     
  2.431531235296615E-004  0.000000000000000E+000
  0.993004292253411       0.000000000000000E+000
  0.995823868422509       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
