         180           8
  0.326504034095040      -0.399182520328871       -1.09385366156874     
  -1.76128952715221       -2.40299339142417       -2.97336716835875     
  -3.54620121983553       -4.11298498409678     
  -12.9256722771784       -13.1372584210816       -13.3710835375608     
  -13.5176331188173       -13.6824457828357       -13.9986737911878     
  -14.3332143150699       -14.6185106917019     
  1.720702818159679E-004  0.000000000000000E+000
  0.993067190191824       0.000000000000000E+000
  0.995907050533923       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
