         180           8
  -1.50141392732321       -2.18241462506972       -2.82654823865417     
  -3.38340974256813       -3.89583847501974       -4.44782307440794     
  -4.98779268921108       -5.41553243883236     
  -12.0684970872608       -12.2112745326354       -12.3551342110397     
  -12.6281214230442       -12.8618163869438       -13.0643188306619     
  -13.3328099719869       -13.5324603403719     
  3.763045820887841E-004  0.000000000000000E+000
  0.992621004217618       0.000000000000000E+000
  0.995515495674148       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
