         180           3
  0.729251377743411      -0.704725996008021       -1.49499973845124     
   17.6654275822724        17.3396903497967        17.5006538689064     
 -1.088283183523433E-003  0.000000000000000E+000
   1.00147050973412       0.000000000000000E+000
  0.998510177854880       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
