         180           8
  -5.13557386531180       -5.53758551402437       -5.99854246242638     
  -6.19987343669187       -6.00007487799448       -6.10838146329278     
  -6.52610906953050       -6.35198314884885     
  -16.3129886187888       -16.7310251612364       -16.9496480612859     
  -17.4852996936660       -18.5794670196794       -19.2968119822369     
  -19.4005105555904       -20.1955034812562     
 -2.306290506175110E-005  0.000000000000000E+000
  0.993199849578423       0.000000000000000E+000
  0.996040044005103       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
