         180           3
   1.62834090621968        3.12767228789344        5.06300279881293     
   15.4653710740711        15.9855715644171        16.5639342382205     
 -8.803370128346104E-004  0.000000000000000E+000
   1.00157055276452       0.000000000000000E+000
  0.998594580908572       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
