         180           8
  -2.61683403605903       -2.76480314345757       -2.90502337317368     
  -3.03123440413464       -3.18739668680127       -3.35028616284556     
  -3.45420014549702       -3.64999738305479     
  -17.2842827926508       -17.0824264746998       -16.7786422096167     
  -16.4512370524550       -16.0273727043029       -15.6131501486661     
  -15.2264905758133       -14.8035869110286     
  3.266495049134555E-004  0.000000000000000E+000
  0.992580264188891       0.000000000000000E+000
  0.995576862878165       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
