         180           3
   1.59952154427845        3.10801296998762        5.03010295234015     
   15.5047088844049        15.9211187959807        16.5718811609174     
 -8.940293065389441E-004  0.000000000000000E+000
   1.00150606064699       0.000000000000000E+000
  0.998625984206459       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
