         180           8
  -2.39053299407916       -2.63726512420068       -2.81097313569758     
  -3.00489788248680       -3.18036580965666       -3.29422537670764     
  -3.38353568175070       -3.51923529979110     
  -17.4619023764960       -17.1726199189560       -16.8445194332143     
  -16.4933344640631       -16.0806794965355       -15.6343197845711     
  -15.2296728976547       -14.7368772331942     
  2.807588202228281E-004  0.000000000000000E+000
  0.992613376049067       0.000000000000000E+000
  0.995589201651996       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
