         180           8
  -2.31965442640973       -2.54781213430572       -2.77496789225886     
  -2.97624550389960       -3.11512637047337       -3.24980828468721     
  -3.38409170310408       -3.57640584578878     
  -17.3748514303265       -17.0558338032793       -16.6994977842917     
  -16.3015500148061       -15.9092277903337       -15.4977511904929     
  -15.1053584559725       -14.5891279443285     
  2.187537772986077E-004  0.000000000000000E+000
  0.992762520120254       0.000000000000000E+000
  0.995696699471560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
