         180           3
   1.00960052987207      -0.257133352207327      -0.811906800968769     
   18.0325911169024        17.5149872099926        18.5191202519966     
 -1.130177142703015E-003  0.000000000000000E+000
   1.00135559891635       0.000000000000000E+000
  0.998561987355166       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
