         180           8
  -5.82353982565035       -6.09651879319161       -6.41477993501810     
  -6.66387846898111       -6.84114817835221       -6.72923704250081     
  -6.46110157728268       -7.59854418727587     
  -15.8362224917505       -16.2311606679116       -16.4288305189619     
  -16.9199643129168       -17.5590187389979       -18.0238860154498     
  -18.5514835832348       -17.8970425390844     
  1.638550434073919E-004  0.000000000000000E+000
  0.993058768517481       0.000000000000000E+000
  0.995949686240354       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
