         180           8
 -0.477041367500082       -1.11315716506461       -1.74114584159480     
  -2.35012244898645       -2.90811290499624       -3.45304118049674     
  -3.96877923070597       -4.48274807794668     
  -12.1108762333371       -12.3398155683541       -12.4251039114610     
  -12.5898123893640       -12.8476043207353       -13.1518923784995     
  -13.4373909310267       -13.5835125272137     
  5.436145996953250E-004  0.000000000000000E+000
  0.992286469201972       0.000000000000000E+000
  0.995243430344501       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
