         180           3
   9.21945406248632        7.00136558054012        4.95419691107306     
   15.7529010519387        16.0503348914348        16.8293401862782     
 -6.951307053463529E-004  0.000000000000000E+000
   1.00176790960734       0.000000000000000E+000
  0.998888270113680       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
