         180           8
 -0.326062411071008       -1.06287824560639       -1.71877784474274     
  -2.37723946224032       -2.97546377063738       -3.55403227054276     
  -4.11214277498717       -4.62478779390699     
  -11.9113968238236       -12.1708716352827       -12.3361083495267     
  -12.5280351057257       -12.7854836963467       -13.0858802301773     
  -13.2995177332186       -13.7082359604731     
  3.773882723892708E-004  0.000000000000000E+000
  0.992838868709401       0.000000000000000E+000
  0.995657583400546       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
