         180           8
 -0.341778061473860       -1.05232521524355       -1.70817980210160     
  -2.39508913575794       -3.01546870348102       -3.56278433152533     
  -4.04853554374785       -4.57683580158819     
  -11.6818248295213       -11.8730406160638       -12.0680219926509     
  -12.3614544845395       -12.6803070059940       -12.9160441611919     
  -13.1825744084038       -13.5154587310344     
  2.977948585357290E-004  0.000000000000000E+000
  0.993116073817764       0.000000000000000E+000
  0.995935480849070       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
