         180           8
  -5.42084998563969       -5.85618151437352       -6.31907354381183     
  -6.41568274474628       -6.09036137362334       -6.28934452060473     
  -6.84609647450150       -6.93116826750724     
  -16.0396818256904       -16.2714876123083       -16.3558085023363     
  -16.8914757103182       -18.2765417408417       -18.9804113181628     
  -18.8473029429479       -19.0799638157596     
  2.160514796251566E-004  0.000000000000000E+000
  0.993038188690814       0.000000000000000E+000
  0.996016458372100       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
