         180           8
 -0.837287602335142       -1.47937984938647       -2.15296320242579     
  -2.78583804877257       -3.36041362358426       -3.91047764282455     
  -4.39653257271196       -4.96295874980392     
  -10.7022342328447       -10.8037705514662       -10.9939296146123     
  -11.1720285485019       -11.3817696278868       -11.6866426898934     
  -12.0115741611113       -12.2161778371402     
  7.272214222725338E-004  0.000000000000000E+000
  0.992404499352650       0.000000000000000E+000
  0.995350490168799       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
