         180           3
   8.32353939752477        6.18465548690766        4.07132004524551     
   16.9869723668036        17.3029833823122        18.1926562348416     
 -6.265108258805083E-004  0.000000000000000E+000
   1.00173135131372       0.000000000000000E+000
  0.998750581535361       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
