         180           8
 -0.836796227558050       -1.59195225678277       -2.21822909853074     
  -2.82892542853958       -3.43982197998405       -4.03350053209101     
  -4.59405333852169       -5.00231270141718     
  -10.6817418151673       -10.7976543978912       -10.9534485926881     
  -11.1873878846121       -11.4489236064845       -11.6742119179217     
  -11.8544972074710       -12.1794722213197     
  6.731764465992496E-004  0.000000000000000E+000
  0.992497266114531       0.000000000000000E+000
  0.995304815655775       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
