         180           8
 -0.763702465814472       -1.48945539771291       -2.23668769632877     
  -2.87893723189973       -3.51943969687071       -4.12715802639677     
  -4.72174353309554       -5.13389554639471     
  -10.7884509368451       -11.0750740861152       -11.2191437675414     
  -11.4573965220986       -11.7434340068126       -12.0526789174111     
  -12.2813038761450       -12.4047931009413     
  6.094810363049955E-004  0.000000000000000E+000
  0.992600300975928       0.000000000000000E+000
  0.995461111131561       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
