         180           8
  -1.72392296089247       -2.46790561582682       -3.07576456909494     
  -3.67479456288075       -4.24781235729304       -4.75050589803901     
  -5.25103434549702       -5.74109555273595     
  -10.4947379726161       -10.5418916282364       -10.7107415856975     
  -10.8911626546469       -11.0889181022175       -11.3421245051836     
  -11.6006186283998       -11.8220194776143     
  6.843908028361477E-004  0.000000000000000E+000
  0.992344131051639       0.000000000000000E+000
  0.995251867090152       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
