         180           3
  0.444622238668662      -0.977288014162213       -1.73268154490280     
   18.9030502326535        18.2386090798485        18.9399869832278     
 -9.449782126538945E-004  0.000000000000000E+000
   1.00137277291064       0.000000000000000E+000
  0.998553167956620       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
