         180           8
  -6.50684929053900       -6.82985617124845       -7.23040706953668     
  -7.43280428406482       -7.35553938798633       -7.39143715837799     
  -7.44798651497793       -7.92099954190351     
  -14.5061169322683       -14.7876443063482       -15.0240031012316     
  -15.8426782544749       -16.8474383040616       -17.3480260070911     
  -17.8630636192944       -16.9613336297122     
  4.287042042858179E-004  0.000000000000000E+000
  0.992724228910483       0.000000000000000E+000
  0.995640206603641       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
