         180           8
  -1.23575556646911       -1.87566516436065       -2.53037881707635     
  -3.23457120492614       -3.86657032237114       -4.44264069342136     
  -5.02837714158349       -5.51428130524475     
  -10.1437079305211       -10.2003239928361       -10.4426691222959     
  -10.7524291862581       -10.9992281993046       -11.2966019974823     
  -11.5986810007620       -11.7352287231420     
  6.741886268329251E-004  0.000000000000000E+000
  0.992599513639333       0.000000000000000E+000
  0.995268774086957       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
