         180           3
  0.499089408932294      -0.711013338222005       -1.62193917059957     
   18.9031604290706        18.6319491373459        18.9531068552452     
 -8.984177331601286E-004  0.000000000000000E+000
   1.00130436976922       0.000000000000000E+000
  0.998618253972845       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
