         180           8
  -6.55427433935147       -6.83013235460288       -7.29723254810900     
  -7.35720430855912       -7.12385707332718       -7.50246754952621     
  -8.15278341065239       -8.02375019027032     
  -14.1693691747806       -14.6226456045289       -14.9305637168374     
  -15.3173029202367       -15.8956449996281       -16.6410992615097     
  -17.0943893704076       -18.0625712337106     
  4.142740106858826E-004  0.000000000000000E+000
  0.992673904678322       0.000000000000000E+000
  0.995534309123983       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
