         180           3
   8.72871009845401        6.62560796341779        4.53690080576504     
   17.3415619157759        17.7296344941524        18.4710521030403     
 -5.605869814797391E-004  0.000000000000000E+000
   1.00189600282140       0.000000000000000E+000
  0.998617960849097       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
