         180           8
  -1.22857393690525       -1.92143427315033       -2.52663186986628     
  -3.14759330624501       -3.77056721540762       -4.34211332305720     
  -4.89630631070824       -5.33289405351975     
  -10.0670528857086       -10.1212549191463       -10.2876188280313     
  -10.4594234027444       -10.6946302342008       -11.0086299707574     
  -11.2210353311302       -11.4962785147563     
  8.504133996221831E-004  0.000000000000000E+000
  0.991917422941667       0.000000000000000E+000
  0.994903678445491       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
