         180           8
  -1.10929939301411       -1.81868287756919       -2.45560033903118     
  -3.11741389440816       -3.77567385591435       -4.37187422149634     
  -4.88608038105517       -5.40973476688861     
  -10.0077004496262       -10.2441563013435       -10.4092580023933     
  -10.6293558461235       -10.8992683921489       -11.1750034198669     
  -11.4471768048423       -11.6097543320238     
  7.706501691007893E-004  0.000000000000000E+000
  0.992147628011578       0.000000000000000E+000
  0.995029431472522       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
