         180           3
   8.20690930708405        6.15301117872937        4.16981886542379     
   17.0061414676414        17.3719878528964        18.1348745220206     
 -5.172189780934286E-004  0.000000000000000E+000
   1.00170585235615       0.000000000000000E+000
  0.998573867567096       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
