         180           8
  -1.17235941847421       -1.79242602245506       -2.48316258199531     
  -3.08719313752666       -3.68568013781022       -4.32476766983988     
  -4.89321242810047       -5.33284516497713     
  -10.3384986195805       -10.4362972816105       -10.6177150127966     
  -10.8400015057686       -11.0845487992999       -11.3409307601754     
  -11.5791931619100       -11.8694734366544     
  6.752584123220208E-004  0.000000000000000E+000
  0.992474354210679       0.000000000000000E+000
  0.995150789614458       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
