         180           8
 -0.945351020076420       -1.61243856460798       -2.23924315668682     
  -2.86473347407831       -3.49516181080071       -4.08154665695799     
  -4.69098102370018       -5.19246181128160     
  -10.4521173146797       -10.5851042234677       -10.7081693921709     
  -10.9158252774150       -11.1920410548494       -11.4181133106878     
  -11.6232681722686       -11.8910697814005     
  6.150344723752777E-004  0.000000000000000E+000
  0.992566598345160       0.000000000000000E+000
  0.995320318193321       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
