         180           3
   7.97935348019149        6.00861078934490        3.97332854212338     
   16.2323051403143        16.8493421434430        17.9195630191319     
 -6.037825941644748E-004  0.000000000000000E+000
   1.00166659228683       0.000000000000000E+000
  0.998570030022706       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
