         180           3
   9.01165471305725        6.91412180911513        4.84759802228376     
   17.8191953382713        18.0865835426251        18.6998099011491     
 -5.450562051245047E-004  0.000000000000000E+000
   1.00171409005234       0.000000000000000E+000
  0.998343784322371       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
