         180           8
  -1.17080170667167       -1.89879784276441       -2.53273674103323     
  -3.14093162541088       -3.72474218490287       -4.29751007922251     
  -4.87807925822007       -5.32669361905315     
  -9.66811536650810       -9.81913248790110       -9.98694428153528     
  -10.1784325741278       -10.4026761929748       -10.7059486008922     
  -10.9959570642335       -11.1823805968672     
  8.299779971291596E-004  0.000000000000000E+000
  0.992268627026102       0.000000000000000E+000
  0.994956176083891       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
