         180           3
   9.05972609948882        6.94172341285886        4.81963850113773     
   17.5510660626010        17.9721638977179        18.6367163857544     
 -5.580861362242389E-004  0.000000000000000E+000
   1.00183376068184       0.000000000000000E+000
  0.998345084743770       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
