         180           8
 -0.989688309928161       -1.74550013485290       -2.38057282677575     
  -3.01354599745071       -3.61755972735961       -4.22728660722069     
  -4.78984467085697       -5.34077502084060     
  -9.99138421358054       -10.0073762947378       -10.1855286085392     
  -10.3904225943909       -10.5982491839513       -10.9496347905257     
  -11.2620151621776       -11.4512431298580     
  8.560758613815067E-004  0.000000000000000E+000
  0.991952974920757       0.000000000000000E+000
  0.994776805285156       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
