         180           3
   8.73764842570183        6.75736792934672        4.70609334229015     
   17.3530041102821        17.7954823249236        18.7562811560492     
 -5.724183516667349E-004  0.000000000000000E+000
   1.00163417379111       0.000000000000000E+000
  0.998219826940661       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
