         180           8
  -1.17962643622319       -1.86140108123269       -2.47953384728046     
  -3.10030120280069       -3.70861376215301       -4.29453673828860     
  -4.83388406093979       -5.32378470498453     
  -10.3146373256830       -10.3633381248819       -10.4327493058609     
  -10.5663630833020       -10.8182065230211       -11.0838963291599     
  -11.2472635503440       -11.2831367415257     
  7.399027962630663E-004  0.000000000000000E+000
  0.992333880640703       0.000000000000000E+000
  0.994981287961226       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
