         180           3
   8.00864262459531        6.25582180196016        4.33646952105672     
   16.8347879976440        17.5355253725164        18.3140386311723     
 -6.045998601051861E-004  0.000000000000000E+000
   1.00165911764600       0.000000000000000E+000
  0.998391390353748       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
