         180           8
  -1.33378799881469       -1.94670696342895       -2.62311840493841     
  -3.21794889626485       -3.86323392048751       -4.40985890970063     
  -4.84862013432281       -5.40640304831797     
  -10.9101447398337       -10.9882189252650       -11.0484040530023     
  -11.1984885043424       -11.3335391000347       -11.4964248786960     
  -11.7368433957638       -11.8020215123698     
  4.713223737380370E-004  0.000000000000000E+000
  0.992839559155657       0.000000000000000E+000
  0.995331030922675       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
