         180           8
  -3.23062157649357       -3.38855007207561       -3.47899617061057     
  -3.55697573800325       -3.71255258812529       -3.86462474142264     
  -3.92994561915405       -4.16277691882687     
  -15.7085908028611       -15.4745028071497       -15.1916077914754     
  -14.8673455492455       -14.4299016578412       -14.0139794267702     
  -13.6429205160885       -13.3787460536156     
  5.709691948578805E-004  0.000000000000000E+000
  0.992474221351891       0.000000000000000E+000
  0.995316805790519       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
