         180           3
  0.146711046252116        1.82934515014013        3.83072860429229     
   16.1870712160501        16.7773645856376        17.4873881877676     
 -6.310779155432522E-004  0.000000000000000E+000
   1.00146316607061       0.000000000000000E+000
  0.998413423110021       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
