         180           3
 -0.125018677141760        1.59389295331823        3.59246848240795     
   16.2601306732664        16.8245554882130        17.5208075811505     
 -5.767692096240653E-004  0.000000000000000E+000
   1.00149114070414       0.000000000000000E+000
  0.998475423376220       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
