         180           8
  -2.51224910934838       -2.82382540025934       -2.97197947338095     
  -3.15539078214520       -3.37535760977715       -3.51459216922318     
  -3.59345356596596       -3.77669312524417     
  -16.2192701982666       -15.9645195002619       -15.5797285070136     
  -15.1254868087893       -14.7506131839513       -14.3779262487352     
  -13.9116647682457       -13.4221076065383     
  3.451920666115411E-004  0.000000000000000E+000
  0.992946800704001       0.000000000000000E+000
  0.995664120321004       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
