         180           8
  -2.68114781881031       -2.79079275693432       -3.07717995535288     
  -3.30418250103290       -3.41389231536238       -3.55765095430288     
  -3.77076154687762       -3.73481711259420     
  -15.4722800956623       -15.4650166640027       -15.2697489814797     
  -14.9792405560116       -14.5562196213783       -14.1679688865596     
  -13.8045760223328       -13.3666296688431     
  2.947548494896657E-004  0.000000000000000E+000
  0.993073323686073       0.000000000000000E+000
  0.995864520022170       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
