         180           3
   8.00025356191895        5.86196959918104        3.74216630389667     
   15.9294488976832        16.2501359971312        16.8030041099860     
 -5.572185460355598E-004  0.000000000000000E+000
   1.00178758209194       0.000000000000000E+000
  0.998947488108913       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
