         180           8
 -5.120461998263228E-002 -0.720325696669607       -1.36038548314073     
  -1.99386910841883       -2.58637968464621       -3.18219745849156     
  -3.74872853331796       -4.33578406230732     
  -11.4209965852418       -11.6512598878113       -11.8166454578224     
  -12.0080289417291       -12.2704327017713       -12.5974826372041     
  -12.9084007587397       -13.0441063889960     
  3.437375601379101E-004  0.000000000000000E+000
  0.993051590566194       0.000000000000000E+000
  0.996002475586831       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
